UPDATE `m_appuser` SET `username` = "${MIFOSX_ADMIN_USER}", `password` = "${MIFOSX_ADMIN_HASH}", `email` = "${MIFOSX_ADMIN_EMAIL}" WHERE `id` = 1;

UPDATE `c_external_service_properties` SET `value` = "admin@example.com" WHERE `external_service_id` = 2 and `name` LIKE "username";
UPDATE `c_external_service_properties` SET `value` = "" WHERE `external_service_id` = 2 and `name` LIKE "password";
UPDATE `c_external_service_properties` SET `value` = "host" WHERE `external_service_id` = 2 and `name` LIKE "host";
UPDATE `c_external_service_properties` SET `value` = "false" WHERE `external_service_id` = 2 and `name` LIKE "useTLS";
